From bab14f0dd2345c9d7dcbc47c918563709e1ac094 Mon Sep 17 00:00:00 2001
From: peavey <peavey@e03df62e-2008-0410-955e-edbf42e46eb7>
Date: Mon, 16 Jul 2007 17:14:45 +0000
Subject: 'svn propset -R svn:eol-style CR *' Set to UNIX-style always.
 Binaries are auto skipped by svn.

git-svn-id: http://svn.inspircd.org/repository/trunk/inspircd@7454 e03df62e-2008-0410-955e-edbf42e46eb7
---
 extras/m_sqllog.sqlite3.sql | 35 +----------------------------------
 1 file changed, 1 insertion(+), 34 deletions(-)

(limited to 'extras/m_sqllog.sqlite3.sql')

diff --git a/extras/m_sqllog.sqlite3.sql b/extras/m_sqllog.sqlite3.sql
index a0772e5e3..020cda1d3 100644
--- a/extras/m_sqllog.sqlite3.sql
+++ b/extras/m_sqllog.sqlite3.sql
@@ -1,34 +1 @@
-CREATE TABLE ircd_log (
-id integer primary key,
-category_id integer,
-nick integer,
-host integer,
-source integer,
-dtime integer);
-
-
-CREATE TABLE ircd_log_categories (
-  category_id integer primary key,
-  category text NOT NULL
-);
-INSERT INTO "ircd_log_categories" VALUES(1, 'Oper');
-INSERT INTO "ircd_log_categories" VALUES(2, 'Kill');
-INSERT INTO "ircd_log_categories" VALUES(3, 'Server Link');
-INSERT INTO "ircd_log_categories" VALUES(4, 'G/Z/K/E Line');
-INSERT INTO "ircd_log_categories" VALUES(5, 'Connect');
-INSERT INTO "ircd_log_categories" VALUES(6, 'Disconnect');
-INSERT INTO "ircd_log_categories" VALUES(7, 'Flooding');
-INSERT INTO "ircd_log_categories" VALUES(8, 'Load Module');
-
-
-CREATE TABLE ircd_log_actors (
-  id integer primary key,
-  actor text
-);
-
-
-CREATE TABLE ircd_log_hosts (
-  id integer primary key,
-  hostname text
-);
-
+CREATE TABLE ircd_log (
id integer primary key,
category_id integer,
nick integer,
host integer,
source integer,
dtime integer);


CREATE TABLE ircd_log_categories (
  category_id integer primary key,
  category text NOT NULL
);
INSERT INTO "ircd_log_categories" VALUES(1, 'Oper');
INSERT INTO "ircd_log_categories" VALUES(2, 'Kill');
INSERT INTO "ircd_log_categories" VALUES(3, 'Server Link');
INSERT INTO "ircd_log_categories" VALUES(4, 'G/Z/K/E Line');
INSERT INTO "ircd_log_categories" VALUES(5, 'Connect');
INSERT INTO "ircd_log_categories" VALUES(6, 'Disconnect');
INSERT INTO "ircd_log_categories" VALUES(7, 'Flooding');
INSERT INTO "ircd_log_categories" VALUES(8, 'Load Module');


CREATE TABLE ircd_log_actors (
  id integer primary key,
  actor text
);


CREATE TABLE ircd_log_hosts (
  id integer primary key,
  hostname text
);

\ No newline at end of file
-- 
cgit v1.2.3

